\documentclass[10pt]{article}

\usepackage{fullpage}
\usepackage{CJKutf8} 
\usepackage[utf8]{inputenc}
\usepackage{setspace}
\usepackage{parskip}
\usepackage{titlesec}
\usepackage[section]{placeins}
\usepackage{xcolor}
\usepackage{breakcites}
\usepackage{lineno}
\usepackage{hyphenat}





\PassOptionsToPackage{hyphens}{url}
\usepackage[colorlinks = true,
            linkcolor = blue,
            urlcolor  = blue,
            citecolor = blue,
            anchorcolor = blue]{hyperref}
\usepackage{etoolbox}
\makeatletter
\patchcmd\@combinedblfloats{\box\@outputbox}{\unvbox\@outputbox}{}{%
  \errmessage{\noexpand\@combinedblfloats could not be patched}%
}%
\makeatother


\usepackage{natbib}




\renewenvironment{abstract}
  {{\bfseries\noindent{\abstractname}\par\nobreak}\footnotesize}
  {\bigskip}

\titlespacing{\section}{0pt}{*3}{*1}
\titlespacing{\subsection}{0pt}{*2}{*0.5}
\titlespacing{\subsubsection}{0pt}{*1.5}{0pt}


\usepackage{authblk}


\usepackage{graphicx}
\usepackage[space]{grffile}
\usepackage{latexsym}
\usepackage{textcomp}
\usepackage{longtable}
\usepackage{tabulary}
\usepackage{booktabs,array,multirow}
\usepackage{amsfonts,amsmath,amssymb}
\providecommand\citet{\cite}
\providecommand\citep{\cite}
\providecommand\citealt{\cite}
% You can conditionalize code for latexml or normal latex using this.
\newif\iflatexml\latexmlfalse
\providecommand{\tightlist}{\setlength{\itemsep}{0pt}\setlength{\parskip}{0pt}}%

\AtBeginDocument{\DeclareGraphicsExtensions{.pdf,.PDF,.eps,.EPS,.png,.PNG,.tif,.TIF,.jpg,.JPG,.jpeg,.JPEG}}

\usepackage[utf8]{inputenc}
\usepackage[english]{babel}



\usepackage{float}








\begin{document}
\begin{CJK}{UTF8}{gbsn}

\title{Design and Experimental Analysis of Novel Multiphase Resonant Motor}



\author[1]{Besong John Ebot}%
\author[1]{Yasutaka Fujimoto}%
\affil[1]{Affiliation not available}%


\vspace{-1em}



  
  \date{April 29, 2026}


\begingroup
\let\center\flushleft
\let\endcenter\endflushleft
\maketitle
\endgroup





\selectlanguage{english}
\begin{abstract}
This paper proposes a novel coreless multiphase magnetic resonant motor
(MMRM) with a high torque per unit volume density (77.6 Nm/m 3) based on
the properties of magnetic resonance coupling. In the proposed model,
the conventional magnetic circuit in electric motors is replaced with
that of a resonant circuit. Resonant capacitors are connected across the
separate multiphase windings to produce the required resonance behavior
in the machine. Analytical models of the machine's characteristics, such
as inductance, generated torque, and capacitance estimation are derived
and verified with an equivalent simulation model through finite element
methods. The key is to efficiently integrate electric machine design
concepts with inductive magnetic resonance coupling technology to
enhance the output torque in an air-cored machine. The motor consists of
a two-phase multiphase stator and rotor windings arranged radially on
non-magnetic cores made from reinforced plastic fiber. Finally, a
prototype is manufactured, and the effectiveness of the MMRM is
validated by experimental results. To evaluate the significance of the
proposed design, a case-control experiment without resonant capacitors
is set up. The proposed MMRM achieved improved performance compared to
related resonant induction machines.%
\end{abstract}%



\sloppy




\selectlanguage{english}
\FloatBarrier
\end{CJK}\end{document}

