\documentclass[10pt]{article}

\usepackage{fullpage}
\usepackage{CJKutf8} 
\usepackage[utf8]{inputenc}
\usepackage{setspace}
\usepackage{parskip}
\usepackage{titlesec}
\usepackage[section]{placeins}
\usepackage{xcolor}
\usepackage{breakcites}
\usepackage{lineno}
\usepackage{hyphenat}





\PassOptionsToPackage{hyphens}{url}
\usepackage[colorlinks = true,
            linkcolor = blue,
            urlcolor  = blue,
            citecolor = blue,
            anchorcolor = blue]{hyperref}
\usepackage{etoolbox}
\makeatletter
\patchcmd\@combinedblfloats{\box\@outputbox}{\unvbox\@outputbox}{}{%
  \errmessage{\noexpand\@combinedblfloats could not be patched}%
}%
\makeatother


\usepackage{natbib}




\renewenvironment{abstract}
  {{\bfseries\noindent{\abstractname}\par\nobreak}\footnotesize}
  {\bigskip}

\titlespacing{\section}{0pt}{*3}{*1}
\titlespacing{\subsection}{0pt}{*2}{*0.5}
\titlespacing{\subsubsection}{0pt}{*1.5}{0pt}


\usepackage{authblk}


\usepackage{graphicx}
\usepackage[space]{grffile}
\usepackage{latexsym}
\usepackage{textcomp}
\usepackage{longtable}
\usepackage{tabulary}
\usepackage{booktabs,array,multirow}
\usepackage{amsfonts,amsmath,amssymb}
\providecommand\citet{\cite}
\providecommand\citep{\cite}
\providecommand\citealt{\cite}
% You can conditionalize code for latexml or normal latex using this.
\newif\iflatexml\latexmlfalse
\providecommand{\tightlist}{\setlength{\itemsep}{0pt}\setlength{\parskip}{0pt}}%

\AtBeginDocument{\DeclareGraphicsExtensions{.pdf,.PDF,.eps,.EPS,.png,.PNG,.tif,.TIF,.jpg,.JPG,.jpeg,.JPEG}}

\usepackage[utf8]{inputenc}
\usepackage[english]{babel}



\usepackage{float}








\begin{document}
\begin{CJK}{UTF8}{gbsn}

\title{Dynamic Average Consensus with Anti-windup applied to Interlinking
Converters in AC/DC Microgrids under Economic Dispatch and Delays}



\author[1]{Manuel Martinez Gomez }%
\author[2]{Marcos E. Orchard }%
\author[2]{Serhiy Bozhko }%
\affil[1]{University of Chile / University of Nottingham}%
\affil[2]{Affiliation not available}%


\vspace{-1em}



  
  \date{May 07, 2026}


\begingroup
\let\center\flushleft
\let\endcenter\endflushleft
\maketitle
\endgroup





\selectlanguage{english}
\begin{abstract}
This work proposes an application of dynamic average consensus in
interlinking converters of AC/DC microgrids with a distributed
anti-windup for dealing with steady-state errors from communication
delays. The proposed controller consists of a PI control that looks
after the power-sharing between interlinking converters while achieving
a global incremental cost consensus. The controller uses an observer (by
dynamic average consensus) for estimating the average power of the
interlinking converter cluster; this method represents an alternative
formulation to conventional single-integrator consensus.~An anti-windup
with reset scheme is proposed to reduce steady-state errors in presence
of fixed time delays. Stability analyses are also presented as well as
simulations. Both show that the proposed controller successfully
balances the power between interlinking converters being comparable with
similar approaches in the literature.%
\end{abstract}%



\sloppy




\selectlanguage{english}
\FloatBarrier
\end{CJK}\end{document}

