\documentclass{article}
\usepackage[affil-it]{authblk}
\usepackage{graphicx}
\usepackage[space]{grffile}
\usepackage{latexsym}
\usepackage{textcomp}
\usepackage{longtable}
\usepackage{tabulary}
\usepackage{booktabs,array,multirow}
\usepackage{amsfonts,amsmath,amssymb}
\providecommand\citet{\cite}
\providecommand\citep{\cite}
\providecommand\citealt{\cite}
\usepackage{url}
\usepackage{hyperref}
\hypersetup{colorlinks=false,pdfborder={0 0 0}}
\usepackage{etoolbox}
\makeatletter
\patchcmd\@combinedblfloats{\box\@outputbox}{\unvbox\@outputbox}{}{%
  \errmessage{\noexpand\@combinedblfloats could not be patched}%
}%
\makeatother
% You can conditionalize code for latexml or normal latex using this.
\newif\iflatexml\latexmlfalse
\AtBeginDocument{\DeclareGraphicsExtensions{.pdf,.PDF,.eps,.EPS,.png,.PNG,.tif,.TIF,.jpg,.JPG,.jpeg,.JPEG}}

\usepackage[utf8]{inputenc}
\usepackage[english]{babel}




\begin{document}

\title{DFG-Proposal}


\author{Alberto Pepe}
\affil{Authorea}



\date{\today}

\maketitle




\textbf{Project Description}

\section{State of the art and preliminary work}

Here comes the state of the art.
First paper that is relevant \cite{25912046}, a second one \cite{24343243}, and another one (bibtex import) \cite{Feuda:2015ew}


\subsection{Project-related publications}
\subsubsection{Articles published by outlets with scientific quality assurance, book publications, and works accepted for publication but not yet published}
here own publications

    \subsubsection{Other publications}


    \subsubsection{Patents}

not applicable



\section{Objectives and work programme}

\subsection{Anticipated total duration of the project}
36 months


\subsection{Objectives}
[Text]
clearly spell out research questions and formulate working hypotheses


\subsection{Work programme incl. proposed research methods}

For each applicant.

    \subsection{Data handling}
[Text]

    \subsection{Other information}

[Text]
Please use this section for any additional information you feel is relevant which has not been provided elsewhere.

    \subsection{Descriptions of proposed investigations involving experiments on humans, human materials or animals}


[Text]

    \subsection{Information on scientific and financial involvement of international cooperation partners}


[Text]






\section{Bibliography}

\printbibliography


\section{Requested modules/funds}

Explain each item for each applicant (stating last name, first name). Follow the outline given in the relevant programme and module guidelines.

[Text]


\section{Project requirements}

    \subsection{Employment status information}

For each applicant, state the last name, first name, and employment status (including duration of contract and funding body, if on a fixed-term contract).

 [Text] 
 
    \subsection{First-time proposal data}

Only if applicable: Last name, first name of first-time applicant.

[Text]

    \subsection{Composition of the project group}

List only those individuals who will work on the project but will not be paid out of the project funds. State each person's name, academic title, employment status, and type of funding.

[Text]

    \subsection{Cooperation with other researchers}


    \subsubsection{Researchers with whom you have agreed to cooperate on this project}


[Text]

    \subsubsection{Researchers with whom you have collaborated scientifically within the past three years}


[Text]

    \subsection{Scientific equipment}

List larger instruments that will be available to you for the project. These may include large computer facilities if computing capacity will be needed.

[Text]

    \subsection{Project-relevant cooperation with commercial enterprises}

If applicable, please note the guidelines contained in the EU's Community Framework for State Aid for Research and Development and Innovation (2006/C 323/01) or contact your research institution in this regard.

[Text]

    \subsection{Project-relevant participation in commercial enterprises}

Information on connections between the project and the production branch of the enterprise.

[Text]




\section{Additional information}

If applicable, please list proposals requesting major instrumentation and/or those previously submitted to a third party here.

[Text]

\selectlanguage{english}
\FloatBarrier
\bibliographystyle{plain}
\bibliography{bibliography/converted_to_latex.bib%
}

\end{CJK}\end{document}

